// numbering from here on
:numbered:

<<<
// 1. Anforderungen und Ziele
include::src/01_introduction_and_goals.adoc[]

<<<
// 2. Randbedingungen
include::src/02_architecture_constraints.adoc[]

<<<
// 3. Kontextabgrenzung
include::src/03_system_scope_and_context.adoc[]

<<<
// 4. Lösungsstrategie
include::src/04_solution_strategy.adoc[]

<<<
// 5. Bausteinsicht
include::src/05_building_block_view.adoc[]

<<<
// 6. Laufzeitsicht
include::src/06_runtime_view.adoc[]

<<<
// 7. Verteilungssicht
include::src/07_deployment_view.adoc[]

<<<
// 8. Querschnittliche Konzepte
include::src/08_concepts.adoc[]

<<<
// 9. Entscheidungen
include::src/09_design_decisions.adoc[]

<<<
// 10. Qualität...
include::src/10_quality_scenarios.adoc[]

<<<
// 11. Risiken
include::src/11_technical_risks.adoc[]

<<<
// 12. Glossar
include::src/12_glossary.adoc[]

'''

(C)
We acknowledge that this document uses material from the arc42 architecture template, http://www.arc42.de.
Created by Dr. Peter Hruschka & Dr. Gernot Starke.