\makeglossaries{}

% Refer to entries using \gls, \Gls, \glspl, \Glspl

%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
% Acronyms
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%

% \newacronym{acpi}{ACPI}{Advanced Configuration and Power Interface}

\newacronym{aot}{AoT}{Ahead-of-Time}
\newacronym{fi}{FI}{Fault Injection}
\newacronym{fail}{FAIL*}{Fault Injection Leveraged}
\newacronym{sdc}{SDC}{Silent Data Corruption}
\newacronym{wamr}{WAMR}{WebAssembly Micro Runtime}
\newacronym{wasm}{Wasm}{WebAssembly}

%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
% Glossary Entries
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%

% \newglossaryentry{apic timer}{%
%   name={APIC Timer},
%   description={A hardware timer that can trigger periodic interrupts by using a counter, integrated in the local APIC}
% }

% \newglossaryentry{fail}{%
%   name={FAIL*},
%   description={Fault Injection Leveraged, a \Gls{fi} framework}
% }
